NAME	     WinFrac       ; Application's module name

DESCRIPTION  'Fractint For Windows'

EXETYPE      WINDOWS	   ; required for all Windows applications

STUB	     'WINSTUB.EXE' ; Generates error message if application
			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD FIXED


HEAPSIZE     2048
STACKSIZE    10240

EXPORTS
	MainWndProc		@1
	About			@2
	OpenDlg 		@3
	SelectFractal		@4
	SelectFracParams	@5
	SelectImage		@6
	SelectDoodads		@7
	SaveAsDlg		@8
	Status			@9
	SelectCycle		@10
	SelectFullScreen	@11
	Select3D		@12
	Select3DPlanar		@13
	Select3DSpherical	@14
	MTWndProc		@15
        CoordBoxDlg             @16
        ZoomBarDlg              @17
        ZoomBarProc             @18
