ConfigPrinter

Options for configuring your printer
to give best looking output.

LeftMargin: Blank spaces at the left
            edge of print out.

BeginCodes & ResetCodes:

Printer control codes (decimal
characters, separated by a space) to
be sent to printer before and after
printing.  80 characters maximum,
including spaces.  (e.g.,  15 for IBM
printers in compressed print mode, 18
to reset to normal print spacing)

Save: Save printer codes.
