Turn-On/Remove/Edit Alarms

MaxiMenu has 10 alarms you can set
for anytime of the day or night.

Alarms ring for one minute or until
you press any key.

Remove deletes the alarm. Unless
you remove an alarm it will repeat
every 24 hours.

Alarm changes (new, removed, edited)
must be saved to take effect the next
time MaxiCalendar is run.

Note: Alarms will only ring if
MaxiCalendar is running or memory
resident version has been loaded.
