Options
ResetTime: Reset system clock.

HrStart: Set 1st time for app'ts.

Int: Interval between appointments.

CivTime: Select '1:30pm' time format.

MilTime: Select '13:30' time format.

Save: Save all choices & colors.

Path: DOS path for calendar files.

NewColors: Choice of screen colors.

Lines: Toggle 43/50 Line mode on/off
       for EGA/VGA monitors.
