MaxiCalendar Screen

Left side of screen is for daily
appointments.

Appointments are attached to a
specific time slot.

Right side of screen is a note pad
for reminders etc.

Notes are NOT attached to a time
slot.


When App't  or App't  appear at
the Top or Bottom of the screen,
there are appointments for this day
that can be viewed by pressing
Ctrl PgUp or PgDn.
