This is the help screen for UPLOT(C)
 
 UPLOT(C) - Universal Plotting pgm.
 
 COPYRIGHT (C) 1990 by Roy L. Lung, -
        ALL RIGHTS RESERVED.
 
      Support on KEEPASM - BBS
 (301) 884-8549 HST 96/24/12/3 BAUDS
              8,N,1
 
*** press a key for next page ***
page 2
You should have the following files:
  INSTALL.EXE = Sets up UPLOT.DAT
  UPLOT  .DOC = Info using UPLOT(C)
  UPLOT  .EXE = This plotting program
  UPLOT  .HLP = This help file
  STUPLOT.BAT = Easy operation file
  DEMO   .BAT = Quick demonistration
  PLOT#  .PLT = Sample plots
  STICK  .EXE = Collect Joystick Data
  MODE*  .DAT = Used by INSTALL.EXE
*** press a key for next page ***
page 3
Keys:
 <Right Arrow>= Move index right
 <Left Arrow> = Move index left
 <Up Arrow>   = Limits info back
 <Down Arrow> = Limits info forward
 <Home Key>   = Index to home plot
 <End Key>    = Index to end plot
 <ESC>=escape = Exit plotting program
 <PAGE UP>    = Magnifies active plots
 <PAGE DOWN>  = Reduces active plots
 *** press a key for next page ***
page 4
 NOTE: Page up/dn will only affect
       scaling amplitude of currently
       active plots and will redraw
       active plots.
 <1>          = Plot x1 toggle
 <2>          = Plot y1 toggle
 <3>          = Plot x2 toggle
 <4>          = Plot y2 toggle
 <5>          = Plot TIME STAMP toggle
      (read note on next page)
*** press a key for next page ***
page 5
 NOTE: <1>-<5> only show affect on
       redraw; upper left corner of
       your screen will show current
       state of the plot toggles -
       0 = off, 1 = on.
 <B> or <b>   = Window starts at index
 <C> or <c>   = Index to center plot
 <E> or <e>   = Window ends at index
                 (activates window)
 <H> or <h>   = This help message
*** press a key for next page ***
page 6
 <I> or <i>   = Set index position
 <L> or <l>   = Plot by line toggle
 <N> or <n>   = New plot - restarts
 <P> or <p>   = Print the plot screen
 NOTE: Print feature only available
       with registered versions!
 <S> or <s>   = Sound toggle (ON/OFF)
 <T> or <t>   = User text entry
 <W> or <w>   = Window toggle
 <Z> or <z>   = Zoom set window
*** press a key for next page ***
page 7
 <F1> = This help message
 <F2> = redraw plot & remove index
        line & limits lines -
       (except the last active limit)
 <F3> = Clock display toggle
 <F4> = File name display toggle
 <F5> = Min/Max plot display toggle
 <F6> = Time stamp display toggle
 <F7> = Amplitude multiplier disp. tog.
 <F8> = Amplitude scale display toggle
*** press a key for next page ***
page 8
 <F9> = Relative position scale toggle
 <F10> = Amp. weight scale disp. toggle
 
 Tips: If you want to magnify only one
       plot and leave the others the
       same, then deactivate all but
       the plot to be affected (see
       help on keys 1 - 5).  Use the
       <PAGE UP> key till it is at the
       desired magnification.  After
*** press a key for next page ***
page 9
Hint: (cont.)
       reactivating the other plots use
       the <F2> key to force a redraw
       of the plots.  The magnification
       will remain in effect till
       demagnified with the <PAGE DN>
       key.  Still remember - ALL
       active plots are affected by the
       <PAGE UP/DN> keys!
 
*** press a key for next page ***
page 10
 REGISTERING:
   To receive a registered
   version of UPLOT(C) and STICK(C)
   please send a donation of $25.00 USA
   to:
       KEEPASM BBS Service
       Roy L. Lung
       2055 Mill Road
       Mechanicsville, MD  20659
 
*** press a key for next page ***
page 11
 REGISTERING: (cont.)
   You will receive the latest version
   along with <P> (print) enabled for
   printing on several popular
   printers and more documentation
   which will include details on data
   file structure.  This extra
   documentation will help you convert
   other plot data sources to be
   useable with UPLOT(C). To receive a
*** press a key for next page ***
page 12
 REGISTERING: (cont.)
   copy of the source code for STICK(C)
   and UPLOT(C) please send a donation
   of $100.00 USA to the above address
   and request the source code be sent.
   Both STICK(C) and UPLOT(C) will work
   best when not used on a multitasking
   system.  Having a color EGA or VGA
   screen will greatly improve both
   speed and usefulness.  Also, speed
*** press a key for next page ***
page 13
 REGISTERING: (cont.)
   can be greatly improved with the
   addition of a Math Co-Processor
   (8087 - 80387) in your system.
   If you desire additional printer
   interfaces or other features to be
   included in future versions - PLEASE
   send a note with your registration.
[end of help screens]
 
*** press a key to end help ***
