e:                     ;cdrom drive letter
c:\pbasic\gigabyte     ;location of cdcom
on                     ;page tone on/off
1000                   ;minimum security to use cdrop.bat
0                      ;minimum security to download
c:\pbasic\gigabyte    ;where to write log to
gigabyte.cat            ;location of sorted description listing
n                      ;allow auto log-off after download y or n
c:\pbasic\gigabyte\temp    ;temp scratch work dir
y                      ;send files from cdrom (y) or temp dir (n)
N                      ;reboot if error 71 or error 72 drive timeout y or n
y                      ;add --- to log file between users
