Alt-F1 Show Log File on Screen

      Puts the log file on screen so you can view it

Alt-F2 Print log file
      
      Prints the log file out on the printer

Alt-F3 Copy log file
      
      Copies the log file to a file you enter or LOG.LOG

Alt-F4 through Alt-F7
      
      Combinations of the above 3 choices

Alt-F8 Delete log file
     
      Deletes the log file. Needs the log delete passwords

Alt-F9 Select Printer Port
    
      Select the printer port (LPT1 - LPT3)

Alt-F10 or F11 Log Menu Help

      Display this help file