F1 Set Short-Cut Passwords

  Allows you to set the short-cut passwords for LOGGER6. If the passwords
already exist, you are required to enter them.

F2 Set Log Delete Passwords
  
  Set passwords for deleting log file. Again, you will be asked for the old
ones if any exist.

F3 Set Access Delete Passwords

  Same as above, but are for deleting the access file

F4 Set Access Edit Passwords

  Same as above, but are for editting the access file

F5 Set Data File Directory

  Allows you select the data directory where the password, access, and log
files will be kept

F6 Set Clock/Cal. Card Type

  Allows you to set the type of Clock/Cal. Card you have or the program
required to retrieve the date/time (e.g. GETCLOCK.COM)

F7 Set Character Limit

  Allows you to set the character limits on the first and last names in
LOGGER61

F8 Complete Set-Up

  Calls ALL of the above functions in the order they appear

F9 Quit Program

  Speaks for itself. You will be asked to verify

F10 Other Menu Help
 
   Displays this help file

Alt-D DOS Shell

   Allows you to "Go to DOS" without exiting the program. Type EXIT to 
return. NOTE: Do not use if you are running DOS 2.xx! Also, do not run any
TSRs because of memory problems it will create.