@=1 Screen 1
a=9f02
b=1
c=1
r=1
t= Help for System Display 
f= Press - [F10] to Quit Help 
m=System Information
n=system.hlp
s=2
d=
m=Using the Function Keys
n=system.hlp
s=3
@=2 Screen 2
a=c702
b=3
c=2
r=3
t= Help: System Information 
f= Press - [F10] to Quit Help 
d=The System Display shows the resources of your machine.
d=
d= Machine Type - Type of machine (PC,XT,AT,etc)
d= Monitor Type - Type of Monitor (CGA,EGA,VGA,etc)
d= Memory       - Free Memory / Total Memory (in kilobytes)
d= Math Chip    - Math Co-processor indicator
d= No. Printers - Number of parallel ports
d= No. Serial   - Number of serial ports
d= DOS Version  - Current DOS Version Number
d=
@=3 Screen #3
a=c702
b=3
c=2
r=3
t= Help: Using the Function Keys 
f= Press - [F10] to Quit Help 
d= The [F2] (Command) key can be used at any time to execute
d= DOS commands without leaving EZ-File Manager. A history of
d= up to 9 previous commands will be displayed. You can enter
d= a new command or choose one of the previous commands. Previous
d= commands can be edited as desired.
d= 
d= The [F10] (Exit) key will exit EZ-File Manager.
